-- phpMyAdmin SQL Dump
-- version 5.2.1
-- https://www.phpmyadmin.net/
--
-- Host: db
-- Erstellungszeit: 27. Sep 2023 um 18:44
-- Server-Version: 10.11.3-MariaDB-1:10.11.3+maria~ubu2204
-- PHP-Version: 8.1.19

SET SQL_MODE = "NO_AUTO_VALUE_ON_ZERO";
START TRANSACTION;
SET time_zone = "+00:00";


/*!40101 SET @OLD_CHARACTER_SET_CLIENT=@@CHARACTER_SET_CLIENT */;
/*!40101 SET @OLD_CHARACTER_SET_RESULTS=@@CHARACTER_SET_RESULTS */;
/*!40101 SET @OLD_COLLATION_CONNECTION=@@COLLATION_CONNECTION */;
/*!40101 SET NAMES utf8mb4 */;

--
-- Datenbank: `gawa`
--
CREATE DATABASE IF NOT EXISTS `gawa` DEFAULT CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci;
USE `gawa`;
